Minimization on hHi˘(x) for alanine dimer vs. simulated annealing on H(x)

iterations

Distribution of energy minima found on hHi˘(x) in 200 runs

final state (kcal/mol)

Distribution of minima found on H(x)

final state (kcal/mol)